C & O 370 MANAGEMENT EVALUATION of Case Study 1 Research Team I.D. Section

Title Diet Problem Evaluation Knowledge of Model . . . . . . . . . . . . . . . . . . . . . . [30] ffl Level - Treatment of Core Problem -Model ffl Assessment of Solution Validity ffl Sensitivity to Core Parameters Sensitivity Analysis . . . . . . . . . . . . . . . . . . . . .[30] ffl Cost and RHS Ranges ffl New Variables and Constraints ffl Applicability to \customer" Software Usage . . . . . . . . . . . . . . . . . . . . . . . . . [20] ffl Used/Developed ffl Extensions Implemented ffl Usability by \Customer" Communication . . . . . . . . . . . . . . . . . . . . . . . . [20] ffl Summary Section ffl Written Presentation ffl Usability of Model by \Customer" TOTAL . . . . . . . . . . . . . . . . . . . . . . . . . . . . .[100] - - - - - - - - - - - - - - - - - - - - - - - - - - - - - - - - - - - - - - - - - - - - - - - - - - - - - - - - - - - - - - Comments: