Comments on Case Study #1

1. Sensitivity analysis was done very poorly:

(a) some only copied the mathematical theory from the text book; (b) sensitivity analysis is NOT re-running the program with different data; but, rather, it is predicting what will happen with small changes in the data;

(c) some only described it in very general terms without giving specifics;

this is supposed to be useful for “the customer”; 2. Solution validity was also done poorly. Please discuss:

(a) reasonableness of solution;

(b) feasibility and optimality of solution, i.e. check e.g. feasibility and complementary slackness.

3. Most outputs/programs in the appendices were not well documented.

Some were totally incomprehensible. If these are not documented then they are detrimental to the mark.